Figure 1. Alignment of the 26 HSF-PLA2 inhibitors used in the CoMFA studies. In the stereo plot, C and H atoms are shown in grey and all other atoms are shown in black.

Supporting Information: Ortiz et al. Reliability of CoMFA models